This is file \MSYS\HELP\INFO.HLP and it needs modified!

This system runs on an IBM PC type computer and is written in C. It
uses TNCs running in KISS mode which allows all the fancy stuff it
does. Location is Kirtland, OH 20 miles NE of Cleveland, OH 44026.
Frequency       Radio      Power      Antenna
7.091           TS-440S    100 W      Dipole    {BBS access only}
14.111          TS-440S    100 W      Dipole    {BBS access only}
145.01          IC-27H      45 W      Ringo ranger at 85 feet
145.05          HW-2036     10 W      Discone at 65 feet
223.7           IC-38A+amp 100 W      7 ele beam at 80 feet pointed west
